LIBRARY	"loopback-ppsapi-provider.dll"
; This is *needed* for x86 (32bit) builds, as it makes sure
; that the *undecorated* names are exported in the DLL.
; It *cannot* be used for the x64 (64bit) builds.
EXPORTS
    ppsapi_prov_init
    prov_time_pps_create
    prov_time_pps_destroy
    prov_time_pps_fetch
    prov_time_pps_kcbind
    prov_time_pps_setparams